Smarsh Accelerates Public Sector Expansion with FedRAMP Authorization Commitment

Smarsh Accelerates Public Sector Expansion with FedRAMP Authorization Commitment Coalfire Partnership Advances Path to Secure Mobile Communication Capture for Federal Agencies Portland, OR – April 22, 2026 — Smarsh, the global leader in digital communications data and intelligence, today announced it has initiated the Federal Risk and Authorization Management Program (FedRAMP®) authorization process for Smarsh...